#############################################################################
#
#                   Copyright (C) 1993 SciTech Software
#                           All rights reserved.
#
# Descripton:   Generic makefile definitions include file. Includes the
#               appropriate definition file for the specified compiler.
#               By default Borland C++ 3.1 is assumed.
#
# $Id: makedefs.def 1.2 1994/03/09 11:22:00 kjb Exp $
#
#############################################################################

!if $d(msc)
!include "\makedefs\msc.def"
!elif $d(watcom)
!include "\makedefs\watcom.def"
!elif $d(symantec)
!include "\makedefs\symantec.def"
!else
!include "\makedefs\borland.def"
!endif

# Define where the 'pmode.c' file is located. You will need to change this
# to reflect where you have installed the pmode library (only necessary if
# you are re-building the libraries for SciTech Software products that
# require this library.

PMODE_DIR       =   c:\bc\src\pmode

# Implicit rules to make the object files for the library...

.c.obj:
    $(CC) $(CC_FLAGS) $(CC_SPECIAL) $(COMPILE_ONLY) {$< }

.cpp.obj:
    $(CC) $(CC_FLAGS) $(CC_SPECIAL) $(COMPILE_ONLY) {$< }
     
.asm.obj:
    $(ASM) $(ASM_FLAGS) $(ASM_SPECIAL) $<, $&


